<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">% \iffalse meta-comment
%
% Part of Will Robertson's DTXGALLERY bundle, version 1.
%
%&lt;*driver&gt;
\documentclass{ltxdoc}
\usepackage{rearrange,fancyvrb}
\EnableCrossrefs
\CodelineIndex
\RecordChanges
%\OnlyDescription
\begin{document}
  \DocInput{\jobname.dtx}
\end{document}
%&lt;/driver&gt;
% \fi
%
% \section{Example of re-arranging docstrip source}
%
% This is a test to show it's working: \string\test\ $\to$ \test
% 
% \section{Documented code}
%
% \noindent This is `defaults' code that the \emph{user} might want to see:
%    \begin{macrocode}
%&lt;*defaults&gt; 
\mytest{1}
%&lt;/defaults&gt;
%    \end{macrocode} 
%
% \noindent And this is the internal code that the user doesn't care so much about:
%    \begin{macrocode}
%&lt;*package&gt; 
\ProvidesPackage{rearrange}[2005/07/15 v0.1 docstrip: rearranging]
\def\mytest#1{\def\test{``#1''}}
%&lt;/package&gt;
%    \end{macrocode} 
%
% \section{Verbatim files that are produced}
% \subsection{rearrange.sty}
% \VerbatimInput[frame=single]{rearrange.sty}
% \subsection{rearrange.ins}
% \VerbatimInput[frame=single]{rearrange.ins}
%
% \Finale
\endinput</pre></body></html>